=================                                   NOSview [301]
/spool/help/@.hlp
=================

USAGE
 @

DESCRIPTION
 The @ command provides Remote Sysop access to the NOS Session
 Manager.  If the 'mbox password' is set, you will have to
 provide 5 characters from the password before you can get
 access.

EXAMPLE
 @
 22 21 18 2 12       {sent by the mailbox}
 apexh               {your response: a=char 22, p=char 21 etc)

